ALTER TABLE `tenant_coinage`.`rfid_base_info`
    ADD COLUMN `warning_flag` tinyint(4) NULL DEFAULT NULL COMMENT '冠字号段可能存在异常标记 1是';
INSERT INTO `sys_menu`
VALUES (36, 1, 0, 6, 14, 'quality', NULL, '车间质量管理', 'quality', '/workshop/baseInfo/quality1', NULL, NULL);
